diff --git a/gpl-lgpl.tex b/gpl-lgpl.tex
index bbff7dcc9718794516c19a3f1f076056650da165..dee81e2615dfc11755a2c9d4ebad42a5fdce1a97 100644
--- a/gpl-lgpl.tex
+++ b/gpl-lgpl.tex
@@ -2749,7 +2749,7 @@ requirement that free software source code be a whole functioning program.
 The previous section skipped over one part of the CCS definition, the
 so-called system library exception.  The ``System Libraries'' definition (and
 the ``Standard Interface'' and ``Major Component'' definitions, which it
-includes) are designed as part
+includes) are designed
 to permit certain distribution arrangements that are considered reasonable by
 copyleft advocates.  The system library exception is designed to allow
 copylefted software to link with these libraries when prohibition of that linking would hurt
