diff --git a/enforcement-case-studies.tex b/enforcement-case-studies.tex
index 47796d8b481b26cd1ca0d11ca3a2e309182af4ca..03626cccab525ca24436d16bff308a36e73dcc8f 100644
--- a/enforcement-case-studies.tex
+++ b/enforcement-case-studies.tex
@@ -447,7 +447,7 @@ $ make
 and waited approximately 40 minutes for the build to complete\footnote{Build
   times will likely vary widely on various host systems.}.  The investigator
 kept a
-\href{https://gitorious.org/copyleft-org/tutorial/source/master:enforcement-case-studies_log-output/thinkpenguin_librecmc-complete.log}{full
+\href{https://k.copyleft.org/guide/files/master/enforcement-case-studies_log-output/thinkpenguin_librecmc-complete.log}{full
   log of the build}, which is not included herein due its size (approximately
 7.2K of text).
 \label{thinkpenguin-main-build}
@@ -515,7 +515,7 @@ mips-librecmc-linux-uclibc-gcc.bin: /lib/libc.so.6:
 \end{lstlisting}
 
    (The
-\href{https://gitorious.org/copyleft-org/tutorial/source/master:enforcement-case-studies_log-output/thinkpenguin_u-boot-build_fail.log}{complete
+\href{https://k.copyleft.org/guide/files/master/enforcement-case-studies_log-output/thinkpenguin_u-boot-build_fail.log}{complete
   log output from the failure} is too lengthy to include herein.)
 
    This issue is an annoyance, not a compliance problem.  It was clear from
@@ -536,7 +536,7 @@ $ ln -s \
 \end{itemize}
 
 The
-\href{https://gitorious.org/copyleft-org/tutorial/source/master:enforcement-case-studies_log-output/thinkpenguin_u-boot-finish_build.log}{full
+\href{https://k.copyleft.org/guide/files/master/enforcement-case-studies_log-output/thinkpenguin_u-boot-finish_build.log}{full
   log of the build} is not included herein due its size (approximately 3.8K
 of text).  After that, the investigator found a new U-Boot image in the
 ``bin'' directory.
@@ -741,7 +741,7 @@ The comparison steps were as follows:
 \begin{enumerate}
   
 \item Extract the filesystem from the image we built by running
-  \href{https://gitorious.org/copyleft-org/gpl-compliance-scripts/source/master:find-firmware.pl}{find-firmware.pl}
+  \href{https://k.copyleft.org/gpl-compliance-scripts/files/master/find-firmware.pl}{find-firmware.pl}
   on ``bin/ar71xx/librecmc-ar71xx-generic-tl-wr841n-v8-squashfs-factory.bin''
   and then running
   \href{http://www.binaryanalysis.org/en/content/show/download}{bat-extratools}'
